CATALOGUE 2020

CARDIO        STRENGTH         THERAPY         ACCESSORIES

Browse Our Range

CARDIO

Treadmills
Treadmill Desk & Workstations
Upright Exercise Bikes
Rowing Machines
Water Resistance Rowing Machines
Spin Bikes
Recumbent Bikes
Elliptical Cross Trainers
Equipment Accessories

3
9
10
11
12
14
17
17
19

STRENGTH

Exercise Benches
Power Racks & Towers
Leg Press & Inversion Table
Gym Stations

20
21
22
23

weights

Dumbbells
Kettlebells
Weighted Vests
Olympic Bars & Weights
Weight Training Accessories
Standard Bards & Weights
Weight Balls & Bags

Functional training

Plyometric Boxes

25
26
27
28
31
32
34

35

rehabilitation

Accessories
Yoga & Therapy
Resistance Bands

36
37
39

treadmills

ARC Treadmill

TMARC
• 1.0 CHP Heavy Duty H1 Motor
• DuraGrip® AS belt 1000mm x 360mm (L x W)
• Light and compact

1.0 to 10 km/h speed

Foldable for easy storage

EKG hand pulse sensors

Reformer Treadmill

TMREFORMER
• 2.25 CHP EverDrive® H3 Motor
• DuraGrip® AS belt  1200mm x 400mm (L x W)
• ShockControl™ Advanced Cushioning System
• Hand rails for safety

12

12 levels auto incline

0.3 to 14 km/h speed

TORQUE 3 TREADMILL

TMTORQUE3
• 4.0 CHP EverDrive® H6 Motor
• DuraGrip® AS belt  1300mm x 540mm (L x W)
• ShockControl™ Advanced Cushioning System

20

20 levels auto incline

1.0 to 18 km/h speed

CARDIO | TREADMILLS

TREADMILL SAFETY KEY

Silicone Spray

TMSAFETYKEY-GENERIC
• 30mm diameter key
• Total length 1.0m

SILSPRAY
Lubricate your treadmill running deck with our recommended multi-purpose silicone spray.
• 300g NET / 509ml

Treadmill Mat 2.0m

MATTREADMILL
• Protects your equipment and floor
• 200cm x 100cm (L x W)
• 4mm thick

Corsair Freerun 200 Curved Treadmill

TMCORSAIRFR200
• Magnetic free-run system
• Self-generator powers display
• Running deck 1600mm x 480mm (L x W)
• 13mm belt thickness

12 levels of manual resistance

Unlimited speed

LCD

LCD display

Eco-friendly motor-less system

Curved Running Belt Design

Adjustable Resistance

Workdata at a Glance

Corsair Freerun 100 Curved treadmill

TMCORSAIRFR100
• Commercial grade running slat belt
1700mm x 440mm (L x W)
• Curved running belt design
• High Intensity Interval Training (HIIT)

Reduce carbon footprint

Compatible

Sync, record and manage your
workout data on your phone.*

*Compatible with Android or IOS devices

Sync to your
equipment

Track & Record Progress

complete training
programs

PURSUIT Treadmill

TMPURSUIT2
• 2.0 CHP EverDrive® H2 Motor
• DuraGrip® AS belt  1200mm x 430mm (L x W)
• ShockControl™ Basic Cushioning System

3 levels
manual incline

3

0.8 to 14 km/h
speed

Large backlit
LCD display

Boost-R Treadmill

TMBOOSTR
• 2.75 CHP EverDrive® H5 Motor
• DuraGrip® AS belt 1300mm x 450mm (L x W)
• ShockControl™ Advanced Cushioning System

18

18 levels
auto incline

1.0 to 18 km/h
speed

Full colour 7" LCD display

Video and music playback

APEX Treadmill

TMAPEX
• 3.25 CHP EverDrive® H6 Motor
• DuraGrip® AS belt  1400mm x 510mm (L x W)
• ShockControl™ Advanced Cushioning System

Viper Treadmill

TMVIPERM3
• 3.75 CHP EverDrive® H7 Motor
• Adv. running deck (1500mm x 520mm)
• Bonus POLAR heart rate chest strap
• ShockControl™  Advanced Cushioning
Experience the cutting edge of running tech with the high-performance Viper. This luxe fitness machine with serious training capabilities features the
3.75 CHP EverDrive® H7 Motor and spacious DuraGrip® Ultra commercial belt to suit any stride length or foot size.

22 levels auto incline

22

1.0 to 20 km/h speed

Assembled size: 195cm x 88cm x 150cm (L x W x H)

Commercial Grade Running Belt
Commercial grade running belt that is designed to last longer than your standard treadmill belt. Five layers to provide superior grip, noise reduction and essential shock absorption during use.

Impact Cushioning System
The ShockControl™ System provides a balance of cushioning and stability for a better quality workout. Protect your knees and joints during workouts with a combination of suspension points, impact absorbing running board and PentaLayerTM treadmill belt.

Save space with HydraAssist®
HydraAssist® creates a simple and effortless way to fold up your treadmill, and a soft-drop mechanism when unfolding your treadmill. Once folded, our Treadmill features transportation wheels for easy mobility.

Everest Treadmill

Ultimate Calorie Burner
Up to a true 22% incline and 6% decline
Get the ultimate calorie burn and intensify your workout by cranking up the automatic incline to a whopping 22% true incline (Level 20) at the push of a button. It doesn’t take long until you’ll feel the burn on the Everest. Simulate down-hill environments and target a different muscle group with a 6% decline.

TMEVEREST
• 4.0 CHP EverDrive® H8 Motor
• DuraGrip® Ultra belt 1550mm x 510mm (L x W)
• Ultra Thick PentalayerTM  5-layer commercial belt
• ShockControl™ Advanced Cushioning

Assembled size: 178cm x 91cm x 179.5cm (L x W x H)

22% max. incline

-6

6% max. decline

1.0 to 24 km/h speed

Marathon Commercial Treadmill

Assembled size: 196cm x 88cm x 156cm (L x W x H)

TMMARATHON
• 4.0 CHP AC EverDrive® H7 AC Motor
• DuraGrip® Ultra belt
1520mm x 560mm (L x W)
• PentaLayerTM  5-layer commercial belt
• Interactive display with
workout programs
• Screen cast function with Android/iOS
• WiFi connectivity
The ultimate treadmill, the Marathon delivers a top of the range running experience with it’s robust commercial components coupled with an intelligent display system on an impressive 15.6" LCD display. Cutting edge technology allows you to play videos and music to keep you entertained during your training sessions. You can even cast content from your smart device to help guide you or for futher entertainment.

0.3 to 20 km/h speed

15.6"

Full colour 15.6 LCD display

Take to the Open Road
Exercise indoors and see the world. Simulate any of Marathon’s pre-set environments to give you the real outdoor running feel.

In-Run Entertainment
Experience the full colour 15.6" LCD display of the Marathon and play/cast any of your favourite videos and music.

Media Streaming
With Marathon’s screen cast function, stream your favourite entertainment or work-out video at a push of a button.
*Please check with us for compatibility

TREADMILL DESK & WORKSTATIONS

01

Walkstation B    Treadmill

TMWALKSTATIONB
Our Walkstation B offers a flexible
and versatile treadmill base and
console unit to fit under your
standing desk.
• 2.25 CHP EverDrive® H6 Motor
• DuraGrip® AS belt
1400mm x 510mm (L x W)
• Wired desktop controller
• ShockControl™ Basic Cushioning

0.8 to 8 km/h
speed range

Remote control  included

02

Ergo Standing Desk

ERGODESK
Our Ergo Standing Desk is designed as a versatile work station to be used in all types of office or home applications.
• Table cord grommet
• 110cm x 60.5cm (L x W) desktop
• Table load capacity of 80kg

Ergo Standing 	Desk

100cm to 135cm
Adjustable height range

CARDIO | TREADMILL DESK & WORKSTATIONS

Walkstation B Treadmill

Walkstation L1 Treadmill

TMWALKSTATIONL1
• 2.25 CHP EverDrive® H3X Brushless Motor
• DuraGrip® AS belt
1200mm x 450mm (L x W)
• Wired desktop controller
• ShockControl™ Basic Cushioning

Remote control included

Cyclestation

CYCLESTATION
Our portable and versatile cyclestation allows you to exercise anywhere.
• Extendable LCD monitor to show stats
• Fits under desks

2.5kg Heavy Duty
Magnetic Flywheel

8

8 levels of resistance

Compact

CARDIO | UPRIGHT EXERCISE BIKES

upright exercise bikes

EXER-11 FOLDING EXERCISE BIKE

EXER11
• Variable manual resistance, 8 levels
• 3-piece forged steel crank
• Adjustable seat height

Easy fold-up design

Magnetic heavy duty cast iron flywheel

8 levels adjustment system

EXER-58 EXERCISE BIKE

EXER58
• Variable manual resistance, 8 levels
• 3-piece crank
• Saddle vertically and horizontally adjustable

Heavy Duty
Magnetic Flywheel

8 Levels of Manual
Resistance

Smooth and Silent Belt Transmission

EXER-60H DUAL ACTION
EXERCISE BIKE

EXER60H
• Variable manual resistance, 8 levels
• Dual action works both arms and legs
• Saddle vertically and
horizontally adjustable

8 Levels of Manual Resistance

Pulse Sensors

EXER-80
EXERCISE BIKE

EXER80
• Variable automatic resistance, 16 levels
• Smooth belt drive system
• 3-piece crank
• Four way saddle adjustment
• 16 workout programs

6kg Heavy Duty
Magnetic Flywheel

16

16 levels Computerised Magnetic Tension

EXER-90H EXERCISE AIR BIKE

EXER90H
• Dynamic air resistance for ultimate workout
• Dual action works both arms and legs
• 4-way saddle adjustment
• Dynamic rotating crank - forged steel
• Extra wide seat for comfort

Air Resistance System

25" Diameter Steel Frame

Exponential Resistance

rowing machines

ROWER-605 MAGNETIC ROWING MACHINE

ROWER605
• Variable automatic resistance, 16 levels
• 39Kg/F max resistance tested
• Quiet drivetrain
• Commercial quality rollers
• Multi-functional LCD display
• Contoured comfortable seat
• 19 workout programs
• Includes POLAR T34 Wireless HR Transmitter

Heavy Duty Cast
Iron Flywheel

16 Level Magnetic
Resistance

Foldable for Easy Storage

Heart Rate Control

ROWER-445 MAGNETIC ROWING MACHINE

ROWER445
• Variable manual resistance, 16 levels
• 18Kg/F max resistance tested
• Quiet drivetrain
• Commercial quality rollers
• Multi-functional LCD display
• Contoured comfortable seat

16 Level Magnetic
Tension Control

Foldable for
Easy Storage

CARDIO | MAGNETIC ROWING MACHINES

water resistance rowing machines

CARDIO | Water Resistance ROWING MACHINES

Smooth Rowing Action
The water resistance rower’s water chamber allows for exceptionally smooth and consistent rowing. The system allows for zero delay in resistance, you’ll feel a smooth and consistent row right from the first stroke. No jerking or jarring to ruin your rhythm or make your workout unpleasant.

Exponential Resistance Curve
Similar to on-water rowing, the resistance is determined by the amount of effort placed in each row. Row harder and you’ll go faster, row easier and you’ll go slower. Exponential and dynamic resistance to suit any fitness level.

Realistic Rowing Feel
In order to replicate the feel of a rowing scull pushing through water, our water resistance rower comes with a water filled chamber coupled with an impeller that spins and pushes water around. This system offers the closest experience and feel to on-water rowing for an excellent workout or training session.

ROWER-700 Water Resistance Rowing machine

ROWER700
• Belt drivetrain
• Multi-functional LCD display
• Store in an upright position

Water Resistance
System

Realistic Rowing Feel

Dynamic Resistance

ROWER-750 Water Resistance Rowing Machine

ROWER700
• Timber look to fit any decor
• Belt drivetrain
• Multi-functional LCD display
• Store in an upright position
• Contoured rowing seat

Smooth and Exponential Resistance

Timber Frame

ROWER-810 WATER RESISTANCE
ROWING MACHINE

ROWER810
• Built to commercial standards
• Belt drivetrain
• Multi-functional LCD display
• Contoured rowing seat

ROWER-800F AIR & MAGNETIC ROWING MACHINE

ROWER800F
• Air and magnetic hybrid resistance system
• Variable automatic resistance, 16 levels
• Multi-functional LCD display
• Built to commercial standards
• Heart rate chest strap compatible
(sold separately)

16 levels Magnetic
Resistance

Wireless HR Compatible

CARDIO | SPIN BIKES

spin bikes

SP-960 SPIN BIKE

4-Way Adjustable Handlebar

Wide Comfortable Premium Racing Seat

Unlimited Resistance

4-Way Adjustable Saddle

25kg Commercial Flywheel

Commercial Grade Cranks & Pedals

SP960
• Large 8" LCD display
• Wireless heart rate monitor compatible
• Commercial tubular steel frame
• Multi-functional LCD display

(Strap sold separately)

25kg TrueSpinTM
Precision Flywheel

Heavy Duty
Belt Drivetrain

Alloy Frame Components
Designed to exceed commercial quality
standards, the SP-960 features precision cut alloy frame components. These result in
seamless seat and handlebar adjustments,
that will also reduce rust in high moisture
environments.

SilentDrive™ System
Enjoy a smooth, quiet ride. Designed to be extra durable,  the belt drive system requires less maintenance and is virtually noiseless: perfect for homes or gyms.

TrueSpin™ Precision Flywheel
All TrueSpin™ flywheels are precision balance tested against stringent standards. This allows for smoother rides, minimizes flywheel knocking noises and prolongs bearing and axle life.

SP-310 SPIN BIKE

SP310
• Aluminum alloy pedals with toe clips
• 4-way adjustable seat
• 130cm x 125cm (L x H) steel frame

13kg TrueSpin™️
Heavy Duty Flywheel

Chain Drivetrain

Tested & Proven in the

world’s largest spin class

SP-340 Spin Bike

SP340
• Aluminium alloy pedals with toe clips
• 4-way adjustable seat
• 117cm x 104cm (L x H) steel frame

SP-460 Spin Bike

SP460
• Aluminium alloy pedals with toe clips
• 4-way adjustable seat
• 130cm x 125cm (L x H) steel frame

18kg TrueSpin™️
Heavy Duty Flywheel

SP-550 Spin Bike

SP550
• Aluminium alloy pedals with toe clips
• 4-way adjustable seat
• 140cm x 118cm (L x H) steel frame

Sp-870 M2 SPIN BIKE

SP870M2
• Quiet belt drivetrain
• Commercial grade crank and pedals
• 4-way adjustable premium racing seat
• Commercial grade steel frame

25kg TrueSpin™️ Heavy Duty Carbon Steel Flywheel

MAGNETIC RESISTANCE

Maintenance Free

Silent Resistance

Smooth Pedalling

SM-100 MAGNETIC SPIN BIKE

SM100
• Two way handlebar adjustment
• 3-piece forged steel crank
• Multi-functional LCD display

13kg Heavy Duty
Cast Iron Flywheel

8 Levels Adjustable
Magnetic Resistance

Smooth Belt
Drivetrain

SM-400 MAGNETIC SPIN BIKE

SM400
• Two way handlebar adjustment
• 3-piece forged steel crank
• Multi-functional LCD display

18kg Heavy Duty
Cast Iron Flywheel

Manual Adjustable
Magnetic Resistance

Velo Plush Seat

SEATVELO
•  Comfortable alternative to a standard sport saddle.

Equipment Mat 1.5m

MATEXEREQUIP
• 150cm x 100cm (L x 1W)
• 4mm thick

Recumbent bikes

RC-81 RECUMBENT BIKE

RC81
• Variable manual resistance, 10 levels
• Heavy duty magnetic flywheel
• Adjustable seat length
• Large LCD display

Ergonomic Seat

iPad/Tablet/
Book Stand

RC-300 RECUMBENT BIKE

RC300
• Variable automatic resistance, 16 levels
• Heavy duty magnetic flywheel
• 15 workout programs
• Adjustable seat length
• Large LCD display

CARDIO | Recumbent Bikes

elliptical cross trainers

X-02 HYBRID CROSS TRAINER

X02
• Hybrid exercise bike and cross trainer
• Chain drivetrain
• Easy to read LCD display
• Bonus dumbbells and
resistance bands

28cm Stride Length

Manual Adjustable
Mechanical Resistance

X-18 Cross Trainer

X18
• Variable manual resistance, 8 levels
• Heavy duty magnetic flywheel
• Silent belt drivetrain
• LCD computer display
• Fixed handlebar

33cm Stride Length

Reversible Motion

EKG Hand Pulse Sensors

CARDIO | Elliptical Cross Trainers

X-22 CROSS TRAINER

X22
• Variable automatic resistance, 16 levels
• 24 workout programs
• Silent belt drivetrain
• Built-in pulse sensors
• Large LCD display

X-41 CROSS TRAINER

X41
• Variable automatic resistance, 16 levels
• 18 workout programs
• LCD computer display
• Built-in pulse sensors
• Music plug-in

36cm Stride Length

16 Levels of Auto Resistance

46cm Stride Length

TABLET
HOLDER

ST-14 Vertex Stair Climber

ST14
• High intensity cardio burn
• Build strength and tone lower half
• Speed: 24spm - 164spm
• Large LCD display

15 Levels of Speed

200

200kg Max Weight

Commercial Grade Design

ST-13 STEPPER WITH AUTO INCLINE

ST13
• Variable automatic resistance, 24 levels
• 15 levels automatic incline
• 12 workout programs
• 8kg heavy duty magnetic flywheel
• LED display dot matrix

Hybrid Magnetic AND
Air Resistance System

15

15 Levels Auto Incline

XT-38 CROSS TRAINER

XT38
• Variable automatic resistance, 16 levels
• Heavy duty cast iron magnetic flywheel
• Natural stride with front
wheel elliptical
• Smooth rear-rollers
• Backlit large LCD screen

XT-44 CROSS TRAINER

XT44
• Variable automatic resistance, 24 levels
• 12 workout programs
• 8kg heavy duty magnetic flywheel
• LED display DOT matrix

Dynamic Hybrid Air AND Magnetic Resistance

Huge 52cm
Stride Length

EKG Hand
Pulse Sensors

EQUIPMENT ACCESSORIES

Wireless Heart Rate Monitor

CHESTSTRAPG1
• Compatible with 5.3khz frequency devices
• Fasten securely
• Greater accuracy
• Comfortable design

Polar T34 Wireless
Heart Rate Monitor

CHESTSTRAPPOLAR
• Compatible with 5.3khz frequency devices
• Fasten securely
• Greater accuracy
• Comfortable design

Rubber Gym Floor Mat 15mm

MATGYM15
• Protects flooring and absorbs vibrations
• 100cm x 100cm (L x W)
• 860kg/m3 density

Passes Fire Test
for Flooring

15mm Thickness

recycled
Rubber Granules

CARDIO | Equipment Accessories

EQUIpment covers

Our covers are great for keeping dust and unwanted debris away from your fitness equipment.
• Made from reliable polyester fabric.
• Resistant to most chemicals, stretching and shrinking,
wrinkle resistant, mildew and abrasion resistant

Polyester Fabric

Elasticised Bottom

Equipment Covers | Measurements (L x W x H)
Universal S/M Treadmill Cover TMCOVER-S | 100cm x 59cm x 146cm
Universal L/XL Treadmill Cover TMCOVER-L | 120cm x 85cm x 160cm
Universal Exercise Bike Cover COVEREB | 115cm x 57cm x 148cm
Universal Spin Bike Cover COVERSB | 130cm x 52cm x 125cm
Universal Cross Trainer Cover COVERCT | 172cm x 64cm x 145cm
Universal Recumbent Bike Cover COVERRB | 170cm x 66.5cm x 110cm

STRENGTH | EXERCISE BENCHES

Exercise benches

Hyper Extension Roman Chair

BENCHROMANCHAIR
• Sturdy steel frame
• Target hamstrings, abdominals, lower back muscles
• Comfortable thick padding

Angled Pad

Heavy Duty
Steel Tubing

AB10 SIT UP BENCH

BENCHAB10
• Target abs and trim waist
• Spring expander with row handle for rows, face-pulls or curls.
• High density padding

Adjustable Incline

Heavy Duty
Steel Frame

BN-6 Bench

BENCHBN6
• Fully adjustable bench with six levels  	  (flat, incline, decline)
• Modular attachments for dip/chin ups
• High density padding

Adjustable Seat Height (2 Levels)

BN-2 ADJUSTABLE BENCH

BENCHBN2
• Comes with a pair of resistance band handles
• Adjustable thigh support
• Leg extension with 25mm weight holder

6 Levels
Adjustable Incline

BENCHBN6-SET
• Set includes chin up attachment and dip attachment

BENCHBN6CUP

BENCHBN6DIP

MF-4000 MULTI-FUNCTION BENCH PRESS

BENCHMF4000
• Extendable and reversible barbell holder
• Adjustable leg rollers
• High density padding

Adjustable Angle
(Flat / Incline)

Barbell Hooks

MF-4000 + 120kg Weight Set Package

BENCHMF4000+120KG
• Includes MF-4000 bench
• Includes 120kg standard
• Cast iron weight set

Safety Spots

power racks & towers

PT-1 POWER TOWER

POWERTOWERPT1
Versatile 4-way power tower
for a big range of exercises.
Great for:
• Dips
• Leg raises
• Vertical knee raises
• Chin ups/pull ups
• Push ups

4-Way Power Tower

PTx-100 POWER TOWER

POWERTOWERPTX100
Great 2-in-1 tower with a 4-way
power tower and in-built foldable
flat or decline bench.
Great for:
• Dumbbell/barbell workouts
• Ab crunches/sit-ups
• Vertical knee raises
• Chin ups/pull ups
• Push ups

STRENGTH | Power Racks & Towers

SR-1 SQUAT RACK

SQUATRACKSR1
Our squat stands are great for barbell bench press, back & front squats, shoulder press and more.
• Adjustable stand width
• Can be used for dips

Adjustable Barbell
Safety Bar

Adjustable J Hooks

SR-2 SQUAT RACK

SQUATRACKSR2
Solid, strong, and tall 1.8m
squat rack. Perfect for squats,
bench press, military shoulder
press, and many more.
• 40cm safety spots
• Resistance band pegs

*Weights and bar not included

PR-2 Half Rack

POWERRACKPR2
Versatile half-rack designed
for olympic and standard
barbells.
• Wide grip pull up handles
• Resistance band pegs
• 4 x Weight storage sleeves
• 2 x Olympic barbell storage 	   	  slots

PT-150 POWER TOWER

POWERTOWERPT150
• 4-way stand
• Exercises ranging from chin ups, dips,  	  leg raises and wide-grip exercises

Commercial
Grade Design

STRENGTH | LEG PRESS & inversion table

PR-3 Power Rack

POWERRACKPR3
Multipurpose full-rack, great for a huge variety of exercises like bench press and squats.
• Precision hole configuration
• 25mm hole spacing in bench press section
• 50mm hole spacing in squat/overhead 	  press section

LEG PRESS & INVERSION TABLE

LP1 Vertical Leg Press

STATIONLP1
Compact leg press compatible with
olympic and standard weight plates.
• Adjustable safety pins
• High density padding
• Back support

Compatible with
Standard and Olympic

Commercial Power SleD

POWERSLEDC1
• Push or pull workouts
• Low and high position handles
• Includes harness

Compatible with
Olympic Weights

*Weights not included

QUANTUM 2 INVERSION TABLE

INVERSIONTABLEQUANTUM2
Take advantage of inversion therapy.
De-compress spinal area to relieve back pain or prolonged back stress.
• Allows an inversion range of 1800
• Adjustable user height range from
130cm to 190cm
• Helps reduce back stress

Leverlock® System

125

125kg Max Weight

Adjustable
Lumbar Support

gym stations

SS2 & GS6 Gym Stations

STATIONSS2 | STATIONGS6
• 78kg weight stack (expandable)
• Height adjustable seat and preacher pad
• Workout diagram chart provided
• 4 attachments included
• Free-standing and foldable ab bench (GS6 only)
• Integrated power tower (GS6 only)

KG

Customisable Weight Stack

2000lb Tensile Strength Cables

38+ exercises for a Full Body Workout

Package | Includes
GS6 Pro Gym Package STATIONGS6-PRO | GS6 Multistation MF-4000 Bench
GS6 Ultimate Gym Package STATIONGS6-ULTIMATE | GS6 Multistation MF-4000 Bench 103kg Upgraded Weight Stack

STRENGTH | GYM Stations

Lat Pull Down Bar

Upper Cable Attachment

Chest Press / Flys

Integrated Power Tower (Allows for body weight exercises ranging from pull ups, chin ups, dips and more)

Middle Cable Attachment

Lower Cable Attachment

Preacher Pad

Expandable Weight Stack* Up to max of 103kg

Sit-up Bench (You’ll be able to achieve awesome abs and strengthen your core with our sit-up bench combo)

Leg Extension

Assembled size:  211cm x 163cm x 248cm (L x W x H)

*Additional 25kg weight stack can be purchased additionally, or included if purchasing GS6 Ultimate Gym Package.

Gym Station Attachments

Close Grip V Handle ATTACHVTRIANGLE
D Bar ATTACHDBAR
Lat Pulldown Bar ATTACHLATPULLDOWNBAR
Cable Curl Bar ATTACHCABLECURLBAR

D Stirrup Handle ATTACHDSTIRRUPHANDLE
Revolving Straight Bar ATTACHREVOLVESTRAIGHTBAR
D Handle Row Bar ATTACHDROW
25kg Weight Stack Addon for GS6/SS2 WPSCONC25

Tricep Rope ATTACHTRICEPROPE
Tri Pushdown Bar ATTACHTRIPRESSBAR
D Handle Wide Row Bar ATTACHDWROW

FT-10 CABLE CROSSOVER STATION

STATIONFT10
• Weight holder compatible with 	  	  25/50mm weights.
• All parts powder-coated or chromed  	  	  as protection against corrosion and   	  	  scratching.
• Lower seated rows with stable footrest
• Rubberised handles for good grip
• Beginner to athlete
Includes:
• 1 x Cable pulley station (assembly set)
• 2 x Weight bracket 25mm
• 2 x Weight bracket 50mm
• 1 x Longitudinal tension rod

75+ Exercises

100

Pulley Weight
Max of 100kg

Strong Steel Frame

17 Vertical Notches
for Height Adjustments

Horizontal Pivoting Pulley

Assembled size:
160cm x 180cm x 210cm (L x W x H)

Bottom Pulley for
Seated Rows

GS-10 MULTI-FUNCTIONAL SMITH AND CABLE MACHINE

STATIONGS10
• Height adjustable cable pull
• 30/50mm weight plate compatibility
• Multi-grip positioning on chin up bar
• Weight plate storage
• Multi-functional rack with chin up and  	  cable exercises

Assembled size:
185cm x 155cm x 225cm (L x W x H)

Pull Up Bar

Adjustable Cable Cross-over

Adjustable Cable Machine

Integrated Smith Machine

Integrated Half Rack

4-in-1 Home Gym

100+ Exercises

dumbbelLs

Adjustable Dumbbell Pair

DBADJUST52.5PAIR
DBADJUST52.5PAIR-STAND
DBADJUSTSTAND
• Contoured handle for easy
gripping weight system
• Stand is an optional extra
• Change weight in seconds

Adjustable from
2.5kg to 24kg

Contoured Handle
for Easy Gripping

Smart Locking

HEX DUMBBELLS SET

DBHEXSET
Ergonomically contoured handles with knurling for grip and comfort. Included with this package, our triangular shaped stand will allow you to neatly store your dumbbells with ease. Rubber feet to stabilise and a sleek black powdercoated steel frame for durability.

1kg-10kg Pair Set

Strong Durable
Steel Frame

PRO-FIXED DUMBBELLS

DBPRO2SET5-30KG
• Heavy duty commercial grade dumbbells
• Rubber pro-style with weight (kg) embossed
• Knurl grip handles
• 2-Tier dumbbell rack

Range from
5kg to 30kg

12 Pairs of
Dumbbells

Smart Locking System

With a simple weight selection dial and smart locking system, it takes seconds to pick the right weight for your workout allowing you to spend more time working out and less time switching weights.

STRENGTH | DumbbellS

Dumbbells & WEIGHTS | Cast Iron Kettlebells

Kettlebells

Cast Iron Kettlebells

• Kettlebell set 4kg to 20kg     KBVINYLSET4-20KG
• Kettlebell set 4kg to 12kg      KBVINYLSET4-12KG
• 2-Tier kettlebell rack              KETTLEBELLRACK2T

Available sizes:
• 4kg   KBVINYL4
• 6kg   KBVINYL6
• 8kg   KBVINYL8
• 10kg KBVINYL10
• 12kg  KBVINYL12
• 16kg  KBVINYL16
• 20kg KBVINYL20

Vinyl Dip
Coating

Premium PU Kettlebells

The go-to kettlebell for those looking for a durable, commercial grade kettlebell. Finished with thick moulded PU to last the distance and protect flooring or racks.

• Scratch resistant polyurethane outer shell
• Rust-free exterior that absorbs impact

Available sizes:
• 8kg   KBPU008
• 10kg  KBPU010
• 12kg  KBPU012
• 14kg KBPU014
• 16kg  KBPU016
• 20kg KBPU020
• 24kg KBPU024
• 28kg KBPU028
• 32kg KBPU032

Commercial Grade use

Stainless Steel Handles

Great for
Home

Colour Coded

Standard Kettlebell

Our EnduraCast kettlebells offer excellent value and come encased in heavy duty plastic for great durability. Plastic encasing minimises damage to flooring and has a smooth surface for good feel and comfortable grip.

Available sets:
• Kettlebell set 6kg to 16kg KBSTANDARDSET6-16KG

• 6kg   KBSTANDARD6
• 8kg   KBSTANDARD8
• 10kg  KBSTANDARD10
• 12kg  KBSTANDARD12
• 16kg  KBSTANDARD16

Heavy Duty
Plastic Shell

Comfortable Grip

2-Tier Kettlebell Rack

KETTLEBELLRACK2T
Our 2-tier kettlebell rack will help store your weights and bars conveniently.

200kg Max
Weight per Tier

3-Tier Kettlebell Rack

KBRACK3TSET
• Designed for gyms or studios, our 3-tier offers more storage for   	  the same space.

Heavy Duty Steel Construction

Dumbbells & WEIGHTS | Kettlebells

Weighted Vests

10kg Weight Vest

WEIGHTVEST-10kg
• Small and easy to wear weight vest
• Dual front buckles for a snug fit

Quick Release Buckle

Mesh Back Pocket

20kg/30kg Adjustable Weight Vest

• Add and remove weight bags to adjust up   	  to 20kg or 30kg weight
• Triple velcro strap for a snug fit
• Shoulder strap buckle for easy removal

Available sizes:
• Up to 20kg  WEIGHTVEST-20kg
• Up to 30kg  WEIGHTVEST-30kg

Flexible Sand Bags

WEIGHTS | OLYMPIC BARS & WEIGHTS

olympic Bars & weights

Competition BumpeR Plates

Available sizes:
• 5kg   BUMPPLATECOMP-05KG
• 10kg  BUMPPLATECOMP-10KG
• 15kg  BUMPPLATECOMP-15KG
• 20kg  BUMPPLATECOMP-20KG
• 25kg  BUMPPLATECOMP-25KG

Designed for
Olympic Lifting

Commercial
Graded

Black Bumper Plates

Available sizes:
• 5kg   BUMPPLATEBK-05KG
• 10kg  BUMPPLATEBK-10KG
• 15kg  BUMPPLATEBK-15KG
• 20kg BUMPPLATEBK-20KG
• 25kg BUMPPLATEBK-25KG

Steel Ring
Core

IWF 450mm
Sizing

03

Olympic Tri-Grip

Available sizes:
• 1.25kg   WPOLYTG00125X2
• 2.5kg    OLYPLATE-2.5KG
• 5kg       OLYPLATE-5KG
• 10kg     WPOLYTG010X2
• 20kg    WPOLYTG020X2

04

Fractional Plates

WPOLYFRAC0065

• Allow for precision loading for consistent  	  progress
• Breakthrough lifting plateaus
• Sold in pack of 6.5kg
• Breakthrough lifting plateaus
• Includes pairs of 0.25kg, 0.5kg, 1kg and 1.5kg

Toaster Rack 16 Plate

WTOLYTOAST16
• Keeps floor tidy and allows for easy access
• 16 slots to fit weight plates

Heavy Duty
Steel Construction

OLympic Weight Tree

WTOLYMPIC
• 3-tier weight tree
• Designed to fit plate diameter
of 450mm or less
• 2x Olympic bar/barbell holders

400

400kg Max Weight

3 Levels of Olympic
Weight Storage

Olympic Bars & Accessories

*Please refer to the website to see weight sets.

Olympic Tri Bar + SC
OLYBBTRISCSET

Olympic Dumbbell Handles + SC
OLYDBPAIRSCSET

06

07

Olympic Trap Bar + SC
OLYBBTRAPSCSET

Olympic Multi Grip Bar + SC
OLYBBMGRSCSET

Olympic Lock Jaw Collars (Pairs)
OLYCOLLARS-LOCKJAW

08

Olympic Swiss Bar (Multi Angle)
OLYBBSWSSCSET

Olympic Alpha Aluminium Collars
OLYCOLLARSALU

05

Olympic Hex Bar + SC
OLYBBHEXSCSET

09

Olympic Farmers Walk Handle (Pairs)
OLYBBFWKSCSET

10

Olympic Curl Bar 47" + SC
OLYCURLBAR

11

7Ft 15Kg Olympic Barbell
OLYBARBELL15SET

7ft 15kg Olympic Barbell
(4 Bearings / 317kg Max)
OLYBARBELL15L-SET

13

14

7ft Olympic Barbell
(4 Bearings / 317kg Max)
OLYBARBELL20L-SET

7ft Olympic Barbell
(4 Bearings / 317kg Max)
OLYBARBELL20LB-SET

7ft Olympic Barbell
(8 Bearings / 317kg Max)
OLYBARBELL20COMP-SET

STRONGMAN LOG BARBELL

OLYBARBELLSTRONGMAN-30KG
• Centre of gravity closer to the body during lifts or rolls
• 200Kg additional
• 2x Lockjaw collars included

200kg Max
Loading

50mm Sleeves

High Quality Black Oxide Coating

Pump Studio Barbell

STUDIO-WEIGHTSET
• Studio barbell with rubber grip (35mm grip)
• 8 sided anti-roll design
• Rubber constructed
• Colour coded for different weights

30mm Hole Diameter

Spring Collar
Clamps included

OLYMPIC WEIGHTLIFTING PLATFORM 3.0M

PLATLIFTOAK225SET
Designed to withstand repeated and heavy drops, while protecting your weights.

• High density rubber to absorb impact
• Reduces noise if weights are dropped
• High density bamboo centre platform provides great   	  feedback to user
• Assembled size: 300cm x 200cm (L x W)

Weight Lifting Chalk

CSACHALKWL
Magnesium chalk for gym, weightlifting, kettlebell or dumbbell. Chalk reduces moisture on hands to improve your ability to maintain grip.
• Pack of 6 (360g)
• 60g each

Weight Training Accessories

Barbell Squat Pad

BARBELLSQUATPAD
Eliminate pain from heavy, centre-knurled barbells during squats so you can focus on your form and lift heavier without discomfort.

43cm Long
10cm Wide

Great Workout
Range

Ergonomical
Design

THICK BAR GRIPS (Pairs)

BARWEIGHTGRIPS-BLACK-PAIR
Turn any barbell or bar into a thicker 50mm diameter handle to improve grip strength and muscle activation.

50mm Diameter

High Quality
Rubber

OLYMPIC POST LANDMINE

BARBELLLANDMINE-POST

Essential for landmine exercises which unlock a huge variety of pulling, pushing squatting, lunging and rotating in one tool.

3600 Range
of Motion

Fits 50mm
Olympic Barbells

250

Max Weight
Load: 250kg

50MM PARALLEL LANDMINE HANDLE

BARBELLLANDMINE-PARH

Paired with the post landmine, the landmine handle unlocks rows for a killer back workout.

Seamless Steel
Sleeves

Strong Steel
Construction

WEIGHTS | WEIGHT Training Accessories

Single Arm Barbell Jack

BARBELLLIFTERSA
Compact single-arm deadlift barbell jack to make loading and unloading plates easier.
• Nylon wear pads protect barbell

300

300kg max weight

Raises Barbell
to 310mm

Deadlift Barbell JACK

BARBELLLIFTER
Spend more energy on lifting weights and less on loading plates with our Deadlift Barbell Jack.
• Allows for easy weight racking
and un-racking
• 200kg max weight
• Nylon wear pads protect barbell
• Durable steel construction

WEIGHTS | STANDARD BARS & WEIGHTS

Standard Bars & weights

25mm Cast Iron
Weights

• Durable cast iron construction
• Reinforced core

Available sizes:
• 1.25kg  WPCAST1.25-4PC
• 2.5kg   WPCAST2.5-4PC
• 5kg      WPCAST5-4PC
• 10kg    WPCAST10-2PC

25mm Hole Diameter

25MM CAST IRON
TRI-GRIP WEIGHTS

• Tri-Grip design for easy handling
• Durable cast iron construction
• Reinforced core

Available sizes:
• 1.25kg  WPSTDCASTTG00125X2
• 2.5kg   WPSTDCASTTG0025X2
• 5kg      WPSTDCASTTG005X2
• 10kg    WPSTDCASTTG0010X2

Steel Ring Core

25mm EnduraShell
Weight Plates

Available sizes:
• 1.25kg  WPCEMENT1.25
• 2.5kg   WPCEMENT2.5
• 5kg      WPCEMENT5
• 10kg    WPCEMENT10

EnduraShell
PVC Coated

20kg Standard Dumbbell Set with Case

DBSET20CASE
• Dumbbell handles with rubber grips and spiral lock collars
• Set comes with 4 x 1.25kg, 4 x 2.5kg cast iron plates
• Carry case included

Designed for Gym
or Commercial Use

20kg Weight Set

Standard Weight Tree

WTSTANDARD
• 3-Tier weight tree
• 2x Standard bar/barbell holders

3 Levels of Standard
Weight Storage

Standard Bars

Standard Dumbbell Handles
DBSTANDARD14

Standard Tri Bar
TRIBARSTD

Standard EZ Curl Bar
CURLBARSTD47

Standard Barbell
BARBELLSTD72A

Dumbbells & WEIGHTS | weIGHT bALLS

Weight Balls and bags

Slam Ball

Available sizes:
• 6kg SLAMBALL6KG  	• 12kg SLAMBALL12KG
• 8kg  SLAMBALL8KG	• 15kg SLAMBALL15KG
• 10kg SLAMBALL10KG  	• 20kg SLAMBALL20KG
• Slam Ball complete 71kg set SLAMBALLSET71

Textured Pattern

Hard, Durable Shell

Slam Ball x

Available sizes:
• 6kg SLAMBALLX6KG
• 8kg  SLAMBALLX8KG
• 10kg SLAMBALLX10KG
• 12kg SLAMBALLX12KG
• 15kg SLAMBALLX15KG
• 20kg SLAMBALLX20KG
• 25kg SLAMBALLX25KG
• 30kg SLAMBALLX30KG

Strong Tyre
Tread Grip

Extra Durable Shell

Medicine Balls

Our rubber medicine balls are great for developing strength, power, endurance, and are suitable for all levels of abilities and ages.

Available sizes:
• 2kg MEDBALL2 		• 8kg MEDBALL8
• 4kg MEDBALL4 		• 10kg MEDBALL10
• 6kg MEDBALL6
• Medicine ball rack MEDBALLRACK10
• Medicine ball 30kg set MEDBALLSET30

Wall Ball

Great for drills to improve weightlifting movements, train strength
and target multiple muscle areas.

Available sizes:
• 4kg WALLBALL-4KG
• 6kg WALLBALL-6KG
• 8kg WALLBALL-8KG
• 10kg WALLBALL-10KG
• Wall ball complete 28kg set WALLBALLSET28

Small Diameter

Large Diameter

Power Bags

Power bags are an excellent conditioning tool and the soft construction of the bag allows for a safe, effective functional way
to train.

Available sizes:
• 5kg   POWERBAG-5KG 	• 20kg POWERBAG-20KG
• 10kg POWERBAG-10KG 	• 25kg POWERBAG-25KG  • 15kg POWERBAG-15KG
• Power bag complete 75kg set POWERBAGSET75

5-Tier Power Bag Rack

POWERBAGRACK5
Keep your power bags stored neatly and in order with our 5-tier power bag rack.

5 Tier Storage

Colour Coded for
Different Weights

Heavy Duty
PU Leather

Plyometric boxes

Plyo Box Set 30cm / 45cm / 60cm

The original plyometric box. Steel frame for exceptional durability and strength. Rubber slip resistant platform and rubber feet for safety and stability.

Available sizes:
• 12” (30cm)  PLYOBOX30-BK
• 18” (45cm)  PLYOBOX45-BK
• 24” (60cm) PLYOBOX60-BK

Rubber
Based Grip

Wooden 3-in-1 Multi Plyo Box

PLYOBOXWOOD3IN1
• Roll over to adjust 3 different heights (51cm, 61cm, 76cm)
•  Side handles for easy mobility

Rotate Box 3-in-1

Easy to
Assemble

Soft 3-in-1 Multi Plyo Box

PLYOBOX-3IN1
• Capable of adjustment to 3 different heights
(51cm, 61cm, 76cm), to allow for progressive exercises.
• Soft structure to cushion accidental falls
• Ultra-high density foam

Durable
PVC Layer

30

Heavy 30kg
Structure

FUNCTIONAL TRAINING | Plyometric Boxes

Soft Plyo Box Set of 4

PLYOBOXSOFT-SET
• Set comes with 15cm, 30cm, 45cm, 60cm
tall plyometric foam boxes
• Base size: 90cm x 75cm (L x W)
• Soft structure to cushion
accidental falls

150cm Max
Height

High Density
EVA Foam

RevoBounce 40 Fitness Trampoline

TRMINI40-2
Our RevoBounce trampoline will burn
heaps of calories while toning quads,
glutes and calves for fun-packed aerobic
workout.
• Comes with resistance bands to
intensify and add variation to
your workout.

40" Diameter

Bonus Resistance
Bands

Steel Zinc
Plated Springs

Height Adjustable
Handle

rehabilitation | ACCESSORIES

accessories

Battle Ropes

Speed Skipping Ropes

ROPEBATTLE3815
• Excellent cardio workout tool
• Maximise fat burn and tone muscles

High Density
Nylon

Heat Shrink
Hand Grips

13kg Total
Weight

• Precision ball bearings and steel head
• 3m coated and adjustable cable

Available sizes:
• Black SKIPROPE-BK
• Silver SKIPROPE-SIL2

Aluminium Knurl
Gripped Handles

TPU Coated
Skipping Cable

Parallel Bars (Pairs)

BARSPARALLEL
Simple, portable, extremely versatile and highly multi-purpose to
work arms, chest, back and core muscles.

200kg Max
Weight

Soft Grip
Handles

Wooden Gym Ring (Pairs)

GYMRING
• Crafted wooden ring and built to FIG specifications
• 4.0m long, 2.5cm wide adjustable nylon straps

400kg Max
Weight

Crafted and Built
to FIG Standards

AB ROLLER WHEEL

ABROLLER
• Great for ab/core workout
• Knee pad included

Ergonomic Rubber Hand Grips

High Grade
TPE Material

Lightweight and Compact

yoga & therapy

Yoga Wheel

YOGAWHEEL-BLU
Excellent tool for stretching, great for back/shoulder/chest opening and quad/hip flex or stretching.

32cm Diameter
15cm Wide

ABS Plastic

EVA Layered Shell
Durable Core

Yoga MAT

Our dual-layer mats are made
with eco-friendly TPE, and come with a soft, comfortable surface while having a grippy, durable underside layer.
Assembled size:
183cm x 61cm x 0.5cm (L x W x H)
Available in 2 colours:
• Pink MATYOGA14PK
• Blue MATYOGA14BLU

Compact and Easy to Carry

DuraGrip®
Underside Layer

rehabilitation | yoga mat

Yoga Mat (Blue)

Foam Roller

ROLLERFOAM90
• Strong core to retain shape
• High quality density EVA foam

15cm Diameter

90cm Total Length

rehabilitation | therapy

Grid Foam Roller

Grid sections with different groove patterns to allow you to vary the intensity of the pressure points.
Available sizes:
• 33cm ROLLEREVAFOAM33
• 60cm ROLLEREVAFOAM60

Folding Exercise Mat 1.8m

MATEXERFOLDING
A great accessory, perfect for any type of work or stretching routine, pilates, gymnastics and any sort of general fitness.
Assembled size: 180cm x 60cm x 5cm (L x W x H)
Folded size: 60cm x 60cm x 15cm (L x W x H)

5cm Thick
Padded Mat

Foldable

Fitness Ball

• Anti-burst material
• Air pump included
Available sizes
• 75cm blue FITNESSBALL75
• 55cm grey FITNESSBALL55-GY
• 65cm grey FITNESSBALL65-GY
• 85cm grey FITNESSBALL85-GY

RESISTANCE BANDS

Resistance Bands Handle

Resistance Bands
5mm (Red)

rehabilitation | Resistance Bands

BANDRESISTHANDLE
• Handles provide extra grip on 	  pulling exercises
• Steel construction for strength
and durability
• More natural grip for most 	  	  movements

Precise Knurl
Gripping

Chrome Plating

Resistance
Bands

Purchase separately or in sets:
• Set of 5 BANDRESIST-SET5		• Set of 10 BANDRESIST-SET10

Available colours and sizes
• 5mm (red) - up to 10kg resistance
• 13mm (blue) - up to 15kg resistance
• 21mm (purple) - up to 30kg resistance
• 32mm (orange) - up to 45kg resistance
• 45mm (green) - up to 60kg resistance

MICRO FLAT RESISTANCE BANDS (PACK OF 6)

RESISTANCE BAND & BELT HANGER

BANDRESIST0308

BANDHOOK16

• Smaller diameter (50cm) than standard resistance bands
• Suited to rehabilitation and workout drills
• Range of 2.5kg to 20kg in resistance
• Pack of 6 (thickness: 0.3mm, 0.4mm, 0.5mm, 0.6mm, 0.7mm, 0.8mm)

• Lightweight steel construction
• Mount to reinforced wall
• 16 Hooks for belts or bands

Lifespan Fitness makes every effort to maintain the accuracy and quality of the information provided on this catalogue.
However, Lifespan Fitness cannot guarantee and assumes no legal liability orresponsibility for the accuracy or
completeness of the information provided. The information contained on this catalogue is for general guidance only.
The copyright of all content on this catalogue is owned by Global Fitness and Leisure and/or the various manufacturers of our equipment. No part of the Lifespan Fitness catalogue may be changed, reproduced, stored in or transmitted on any website or medium without the prior written permission of Lifespan Fitness. Requests to republish any material must be sent to info@lifespanfitness.com.au.