cardio ·  strength  ·  Therapy  ·  accessories

Browse Our Range

Treadmills
Treadmill Desk & Work Stations
Upright Exercise Bikes
Rowing Machines
Spin Bikes
Recumbent Bikes
Elliptical Cross Trainers
Exercise Benches
Leg Press & Power Sleds
Power Racks, Towers & Gym Stations
Standard 25mm Weight Plates & Bars
Studio 30mm Weight Plates & Bars
Olympic 50mm Weight Plates & Bars
Barbell Accessories
Dumbbells
Kettlebells
Weight Balls & Bags
Plyometric Boxes
Exercise & Training Essentials
Yoga & Therapy

3
9
10
10
12
15
15
18
18
19
23
23
24
25
25
26
27
28
29
31

TREADMILLS

Arc Treadmill

TMARC
• Light & Compact
• Easy storage
• Great for walking
• 10km/h Max Speed
• 1.0 CHP H1 Motor

Pursuit 2 Treadmill

TMPURSUIT
• 14km/h Max Speed
• 1.5 CHP EverDrive® H2 Motor
• 125cm x 42cm Running Deck
• 3 Level Manual Incline
• ShockControl™ Cushioning

Foldable for
Easy Storage

Reformer Treadmill

TMREFORMER
• 0.3 to 14km/h Speed Range
• 1.75 CHP EverDrive® H3 Motor
• 120cm x 40cm Running Deck
• 12 Level Automatic Incline
• Designed for rehab,
seniors or walkers

Treadmill Mat 2.0m

MATTREADMILL
• Protects your equipment and floor
• 200cm x 100cm (L x W)
• 4mm thick

Silicone Spray

SILSPRAY
Lubricate your treadmill running deck
or other moving components with our
recommended multi-purpose silicone spray.
Food grade, Aerosol form with extending tube for easy reach.
• 300g NET / 509ml

More than just  a Treadmill

With an integrated 7” TFT LCD Colour Display, workouts will no longer feel like a chore.
Pump your favourite tracks or play videos to
keep yourself entertained and coming back
for more.

7” WSVGA TFT 1024 x 600
LCD Screen

AUX 3.5mm or USB Plug-in*
for Music Playback

USB Plug-in* for Video Playback

Boost-R Treadmill

TMBOOSTR
• 18km/h Max Speed
• 2.0 CHP EverDrive® H5 Motor
• 130cm x 45cm Running Deck
• 18 Level Automatic Incline
• ShockControl™ Advanced Cushioning
• MP3 Playback

Apex Treadmill

TMAPEX
• 18km/h Max Speed
• 2.5 CHP EverDrive® H6 Motor
• 140cm x 51cm Running Deck
• 18 Level Automatic Incline
• ShockControl™ Advanced Cushioning
• MP3 Playback

Now available on the

BOOST-R and APEX

Torque 3 Treadmill

TMGOLD2-H
• 18km/h Max Speed
• 3.0 CHP EverDrive® H7 Motor
• 145cm x 51cm Running Deck
• 18 Level Automatic Incline
• ShockControl™ Advanced Cushioning
• MP3 Playback

Corsair Freerun 200 Curved Treadmill

TMCORSAIRFR200
• Magnetic Free-run System
• No limitations on speed
• 6 Modes of Magnetic Resistance
• 160cm x 48cm Running Deck
• LCD Display

Viper M3 Treadmill

TMVIPERM3
• 20km/h Max Speed
• 3.0 CHP EverDrive® H7 Motor
• Adv. Running Deck (150cm x 52cm)
• 22 Levels of Automatic Incline
• BONUS Polar Chest Strap
• PAFERS Bluetooth Technology
• ShockControl™ Advanced Cushioning
Experience the cutting edge of running tech with the high-performance Viper M3. This luxe fitness machine with
serious training capabilities features the 3.0 CHP EverDrive H7 Motor, an LCD Colour display stacked with features and an impressive 22 levels of automatic incline.
Viper M3 is Fitlink Compatible meaning you’ll be able to track your workout on your phone and save all your workout data in one secure location. Available for download for Free on iOS / Android.

Assembled Size:
195cm x 88cm x 150cm (L x W x H)

Take control of your Lifespan Fitness product with the FitLink app to undertake a variety of training plans, and save all your workout data in one secure location. Pair with Apple Health and your personal heartrate tracker to compile a complete list of statistics about your health and wellbeing.

Featuring a ultra thick PentaLayer™ Commercial running belt that is designed to last longer than your standard treadmill belt. 5 layers to provide superior grip, noise reduction and essential shock absorption during use.

The ShockControl™ System provides a balance of cushioning and stability for a better quality workout. This system of integrated support is provided by the combination of suspension points, an impact reducing running board
and integrated incline motor.

Everest Treadmill

Ultimate Calorie Burner
Up to a true 22% incline and 6% decline
Get the ultimate calorie burn and intensify your workout by cranking up the automatic incline to a whopping 22% true incline (Level 20) at the push of a button. It doesn’t take long until you’ll feel the burn on the Everest. Simulate down-hill environments and target a different muscle group with a 6% decline.

TMEVEREST
• 24km/h Max Speed
• ShockControl™ Advanced Cushioning
• 4.0 CHP EverDrive® H8 Motor
• 155cm x 51cm DuraGrip® Ultra Running Belt
• 20 Levels Automatic Incline
• 6 Levels Automatic Decline
• Compatible with FitLink App
• 155cm DuraGrip® Ultra Running Belt
Assembled Size:
178cmx 91cm x 179.5cm (L x W x H)

Marathon Treadmill

TMMARATHON
• 20km/h Max Speed
• 3.0 CHP AC EverDrive® H7 AC Motor
• Huge 152cm x 56cm Running Deck
• 20 Levels of Automatic Incline
• Full Colour 15.6” LCD Display
• Interactive Display with Workout Programs
• Screen Cast function with Android/iOS
• WiFi Connectivity
• Fitlink App Compatible
The ultimate Treadmill, the Marathon delivers a top of the range running experience with it’s robust commercial components coupled with an intelligent display system on an impressive 15.6” LCD Display. Cutting edge technology allows you to play videos and music, or even cast content on your screen from a smart device to help guide or simply keep you entertained on your fitness journey.
Assembled Size:
196cm x 89cm x 156 cm (L x W x H).

Exercise indoors and see the world. Simulate any of Marathon’s preset environments to give you the real outdoor running feel.

Experience the full colour 15.6” LCD display of the Marathon and play or cast any of your favourite videos and music.

With Marathon’s Screen Cast function, Stream your favourite entertainment or work-out video at a push of a button.
*Please check with us for compatibility

WORK STATIONS

01  Walkstation B Treadmill

TMWALKSTATIONB
Our Walkstation B offers a flexible
and versatile treadmill base and
console unit to fit under your
standing desk.
• 0.8 - 8km/h Speed Range
• 2.25 CHP EverDrive® H6 Motor
• 140cm x 51cm Running Belt
• Wired Desktop Controller

02  Ergo Standing Desk

ERGODESK
Our Ergo Standing Desk is designed as a versatile work station to be used in all types of office or home applications.
• 100cm to 135cm Adjustable
Height Range
• Table Cord Grommet
• 110cm x 60.5cm (L x W) Desktop
• Table Load Capacity of 80kg

02  Ergo Standing 	       Desk

01  Walkstation B
Treadmill

Cyclestation

CYCLESTATION
Our portable and versatile cyclestation allows you to exercise anywhere.
• 8 levels adjustable tension
• 2.5kg Magnetic Flywheel
• Extendable LCD Monitor to show stats
• Fits under desks

Upright Exercise Bikes

EXER-58 Exercise Bike

EXER58
• Manual Magnetic Resistance
• 8 Level Adjustable Tension
• Quiet Belt Drivetrain
• 4-way Saddle Adjustment
• Wide Comfort Saddle

EXER-80 Exercise Bike

EXER80
• Automatic Magnetic Resistance
• 16 Level Adjustable Tension
• Quiet Belt Drivetrain
• 4-way Saddle Adjustment
• Wide Comfort Saddle
• Integrated Speakers
• USB Charging

Rowing Machines

ROWER-442 Rowing Machine

ROWER442
• Manual Magnetic Resistance
• 12 Level Adjustable Tension
• LCD Monitor
• Foldable for Easy Storage
• Contoured Comfortable Seat

EXER-60H Exercise Bike

EXER60H
• Dual Motion Cardio Bike
• Manual Magnetic Resistance
• 8 Level Adjustable Tension
• Quiet Belt Drivetrain
• 4-way Saddle Adjustment
• Wide Comfort Saddle

EXER-90H Exercise Bike

EXER90H
• Dual Motion Cardio Bike
• Exponential Air Resistance
• 25” Diameter Steel Fan
• Commercial Chain Drivetrain
• 4-way Saddle Adjustment
• Wide Comfort Saddle

ROWER-605 Rowing Machine

ROWER605
• Automatic Magnetic Resistance
• 16 Level Adjustable Tension
• Maximum of 39kg/f Resistance
• LCD Monitor with workout programs
• BONUS Polar Chest HR Strap
• Pace & Distance stats available
• Folds up for storage

WHY WATER RESISTANCE?

Smooth Rowing Action
The Water Resistance Rower’s water chamber allows for exceptionally smooth & consistent rowing. The system allows for zero delay in resistance, you’ll feel a smooth and consistent row right from the first stroke. No jerking or jarring to ruin your rhythm or make your
workout unpleasant.

Exponential Resistance Curve
Similar to on-water rowing, the resistance is determined by the amount of effort placed in each row. Row harder and you’ll go faster, row easier and you’ll go slower. Exponential and dynamic resistance to suit to any fitness level.

Realistic Rowing Feel
In order to replicate the feel of a rowing scull pushing through water, our Water Resistance Rower comes with a water filled chamber
coupled with an impeller that spins and
pushes water around. This system offers the closest experience and feel to on-water rowing for an excellent workout or training session.

ROWER-700 Water Resistance

ROWER-800 Water Resistance

ROWER700
• Smooth & Exponential Resistance
• Realistic Water Rowing Feel
• LCD Monitor
• Speed and Time stats available
• Folds up for Storage
Assembled Size:
220cm x 55cm x 50cm (L x W x H)

ROWER800
• Smooth & Exponential Resistance
• Realistic Water Rowing Feel
• Built to withstand commercial environments
• LCD Monitor
• Pace & Distance stats available
• Folds up for storage
Assembled Size:
207cm x 56cm x 48cm (L x W x H)

Rower-810

Rower-445 - ask blissy for final pics

rower750

SPIN BIKES

SP-330 Spin Bike

SP330
• Unlimited Resistance
• 13kg Cast Iron Flywheel
• Chain Drivetrain
• Enclosed Flywheel
for safety
• LCD Monitor

Tested & Proven in the

world’s largest spin class

SP-460 Spin Bike

SP460
• Unlimited Resistance
• 18kg Cast Iron Flywheel
• Chain Drivetrain
• LCD Monitor with RPM
• Pulse Sensors

SP-870 M2 Spin Bike

SP870M2
• Unlimited Resistance
• 25kg Carbon Steel Flywheel
• Quiet Belt Drivetrain
• Commercial Crankset
• Commercial Frame
• LCD Monitor with RPM
• Pulse Sensors

SP-550 Spin Bike

SP550
• Unlimited Resistance
• 18kg Cast Iron Flywheel
• Quiet Belt Drivetrain
• LCD Monitor with RPM
• Pulse Sensors

SP-960 Spin Bike

SP960
Assembled Size:
131cm x 61cm x 115cm (L x W x H)

Wide Comfort Saddle

4-Way Adjustable Saddle

Commercial Quality Crankset

(Strap sold separately)

4-Way Adjustable Handlebar

Unlimited Resistance

25kg Commercial Flywheel

Alloy Frame Components
Designed to exceed commercial quality
standards, the SP-960 features precision cut alloy frame components. These result in
seamless seat and handlebar adjustments,
that will also not rust in high moisture
environments.

SilentDrive™ System
Enjoy a smooth, quiet ride. Designed to be extra durable, belt drive systems require less
maintenance and are virtually noiseless: perfect for homes or gyms.

TrueSpin™ Precision Flywheel
All TrueSpin™ flywheels are precision balance tested against stringent standards.
This allows for smoother rides, minimizes flywheel knocking noises and prolongs bearing & axle life.

MAGNETIC SPIN BIKES

SM-100 Spin Bike

MAGNETIC RESISTANCE

Experience smooth, quiet and maintenance free resistance.

Maintenance Free

Silent Resistance

Smooth Pedalling

* Magnetic resistance do not wear out and require replacement like regular friction pads

SM-400 Spin Bike

Velo Plush Seat

SM400
• Adjustable Magnetic Resistance
• 18kg Cast Iron Flywheel
• Quiet Belt Drivetrain
• LCD Monitor with RPM
• Pulse Sensors
• Maintenance Free*

SEATVELO
• Comfortable alternative to
a standard sport saddle.

Equipment Mat 1.5m

MATEXEREQUIP
• 150cm x 100cm (L x W)
• 4mm thick
• Protects your equipment and floor

recumbent bikes

RC-81 Recumbent Bike

RC81
• Magnetic Resistance
• 8 Level Adjustable Tension
• Ergo Comfort Mesh Seat
• Adjustable Seat Length
• Quiet Belt Drivetrain
• LCD Display
• Pulse Sensors

RC-300 Recumbent Bike

RC300
• Automatic Magnetic Resistance
• 16 Level Adjustable Tension
• Ergonomic Comfort Mesh Seat
• Quick-Release Lever Seat Adjustment
• Quiet Belt Drivetrain
• LCD Display
• Pulse Sensors

Elliptical Cross Trainers

X-03 Cross Trainer

X03
• 2-in-1 Hybrid
• Cross Trainer & Exercise Bike
• Adjustable Mechanical Resistance
• 28cm Elliptical Stride
• LCD Display
• Adjustable Seat Height
• 2lb & 3lb Dumbbells
• Resistance Bands
• Pulse Sensors

X-22 Cross Trainer

X22
• Automatic Magnetic Resistance
• 16 Level Adjustable Tension
• 36cm Elliptical Stride
• Quiet Belt Drivetrain
• LCD Display
• Pulse Sensors
• 24 Workout Programs

X-18 Cross Trainer

X18
• Manual Magnetic Resistance
• 8 Level Adjustable Tension
• 33cm Elliptical Stride
• Quiet Belt Drivetrain
• LCD Display
• Pulse Sensors

X-41 Cross Trainer

X41
• Automatic Magnetic Resistance
• 16 Level Adjustable Tension
• 46cm Elliptical Stride
• Quiet Belt Drivetrain
• LCD Display
• Pulse Sensors
• 18 Workout Programs
• Integrated Speakers (AUX Plug-in)

XT-38 Cross Trainer

XT38
• Front Wheel Drive Elliptical
• Automatic Magnetic Resistance
• 16 Level Adjustable Tension
• 46cm Elliptical Stride
• Quiet Belt Drivetrain
• LCD Display
• Pulse Sensors
• 21 Workout Programs

XT-45 Cross Trainer

XT45
• Front Wheel Drive Elliptical
• Automatic Magnetic Resistance
• 32 Level Adjustable Resistance
• 51cm Stride Length
• Automatic Incline
• Quiet Belt Drivetrain
• Wireless Heartrate Monitor Compatible
• 12 Pre-Set Workout Programs
• Integrated Speakers
• LED Display
• Pulse Sensors

XT-44 Cross Trainer

XT44
• Front Wheel Drive Elliptical
• Automatic Magnetic Resistance
• 24 Level Adjustable Resistance
• Dynamic Air Resistance
• 52cm Stride Length
• Quiet Belt Drivetrain
• LED Display
• Pulse Sensors
• Wireless Heartrate Monitor Compatible
• 12 Pre-Set Workout Programs
• Integrated Speakers

Special Order Only.
Call 1300 169 600 for more information.

ST-13 Stepper

ST13
• Automatic Magnetic Resistance
• 24 Level Adjustable Resistance
• Dynamic Air Resistance
• 15 Level Adjustable Incline
• Wireless Heartrate Monitor Compatible
• Quiet Belt Drivetrain
• LED Display
• Pulse Sensors
• 12 Pre-Set Workout Programs
• Integrated Speakers

Wireless Heart Rate Monitor

CHESTSTRAPG1
• Compatible with 5.3khz
Frequency Devices
• Fasten Securely
• Greater Accuracy

Polar T34 Wireless Heart Rate Monitor

CHESTSTRAPPOLAR
• Compatible with 5.3khz
Frequency Devices
• Fasten Securely
• Greater Accuracy

Rubber Gym Floor Mat 15mm

MATGYM15
• Protects Flooring & absorbs vibrations
• 100cm x 100cm (L x W)
• 15mm thick*
• 860kg/m3 Density

*Thickness may vary due to manufacturing & curing process. Speak to us for more details.

Equipment Covers

Our covers are great for keeping dust and
unwanted debris away from your fitness equipment.
• Made from reliable polyester fabric.
• Resistant to most chemicals, stretching and shrinking,
wrinkle resistant, mildew and abrasion resistant.

Equipment Covers | Measurements (L x W x H)
Universal S/M Treadmill Cover TMCOVER-S | 100cm x 59cm x 146cm
Universal L/XL Treadmill Cover TMCOVER-L | 120cm x 8.5cm x 160cm
Universal Exercise Bike Cover COVEREB | 105cm x 57cm x 148cm
Universal Spin Bike Cover COVERSB | 130cm x 52cm x 125cm
Universal Cross Trainer Cover COVERCT | 145cm x 58cm x 172cm
Universal Recumbent Bike Cover COVERRB | 170cm x 67cm x 110cm

Exercise Benches

Adjustable Roman Chair

BENCHROMANCHAIR
• Adjustable Roman Chair
• Target Hamstrings, Abdominals, Lower back muscles
• Adjustable Incline Angle
• Adjustable Height
• Comfortable Thick Padding

BN-6 Bench

BENCHBN6
• Fully Adjustable Bench with 6 Levels (Flat, Incline, Decline)
• Adjustable Seat Height (2 Levels)
• Modular Attachments for Dip / Chin Ups
• High Density Padding
BENCHBN6-SET
• Set includes Chin up Attachment
and Dip attachment

MF-4000 Bench

BENCHMF4000
• Extendable & Reversible Barbell Holder
• Adjustable Angle (Flat / Incline)
• Adjustable Leg Rollers
• High Density Padding

MF-4000 + 120kg Weight Set Package

BENCHMF4000+120KG
• Includes MF-4000 Bench
• Includes 120kg Standard
• Cast Iron Weight Set

Leg Press & Power Sleds

*Weights & Bar Not Included

LP-1 Vertical Leg Press

Commercial Power Sled with Harness

STATIONLP1
Compact Leg-Press compatible with
Olympic & Standard Weight Plates.
• Adjustable Safety Pins
• High Density Padding

POWERSLEDC1
• Commercial Steel Frame
• Push or Pull workouts
• Low & High Position Handles
• Compatible with Olympic Weights
• Includes Harness

Power Racks, Towers & Gym Stations

PT-1 Power Tower

POWERTOWERPT1
Versatile 4-way Power Tower for
a big range of exercises.
Great for:
• Dips
• Vertical Knee Raises
• Chin Ups / Pull ups
• Push ups

PTX-100 Power Tower

POWERTOWERPTX100
Great 2-in-1 tower with a 4-way
power tower and in-built foldable
flat or decline bench.
• Adjustable J-Hooks for Bars & Barbells
• Leg Rollers for Ab workouts
Great for:
• Dumbbell / Barbell Workouts
• Ab Crunches / Sit-ups

*Weights Included

SR-1 Squat Rack

SQUATRACKSR1
Our Squat Stands are great for barbell bench press, back & front squats, shoulder press and more.
• Adjustable J-Hooks / Safety Spots
• Adjustable Stand Width
• Can be used for Dips

SR-2 Squat Rack

SQUATRACKSR2
Solid, strong, and tall 1.8m
Squat Rack. Perfect for squats,
bench press, military shoulder
press, and many more.
• Adjustable J-Hooks
• 40cm Safety Spots
• Resistance Band Pegs

PR-2 Half Rack

POWERRACKPR2
Versatile Half-Rack designed for
Olympic & Standard Barbells.
• Adjustable J-Hooks / Safety Spot Bars
• Adjustable Dip Attachment
• Wide Grip Pull Up Handles
• Resistance Band Pegs
• 4 x Weight Storage Sleeves
• 2 x Olympic Barbell Storage Slots

PR-3 Power Rack

POWERRACKPR3
Multipurpose Full-Rack, great
for a huge variety of exercises
like bench press and squats.
· Adjustable J-Hooks / Safety Spot Bars
• Adjustable Dip Attachment
• Resistance Band Pegs
• Fat and Skinny Interchangeable
Chin-Up Bars
• Precision Hole Configuration
• 25mm Hole Spacing in Bench
Press section
• 50mm Hole Spacing in Squat/Overhead     	  Press Section

GS10 Multi-functional Smith and Cable Machine

All in one ultimate gym system

STATIONGS10
• Height adjustable cable pull
• 30/50mm weight platecompatibility
• Olympic sized Smith Machine Barbell
• Two adjustable J Hooks & safety spotters
• Multi-grip positioning on chin-up bar
• Weight Plate storage & attachment holders
• Multifunctional rack with chin-up
and cable exercises

Assembled Size:
185cm x 155cm x 225cm (L x W x H)

GS6 Multi Gym Station

STATIONGS6
• 38+ exercises for a full body workout
• 78kg Weight Stack (Expandable)
• Height Adjustable Seat & Preacher Pad
• Workout Diagram Chart provided
• 2000lb Tensile Strength Cables
• 5 Standard Attachments included
• Free-standing & foldable Ab bench
• Integrated Power Tower
Assembled Size:
211cm x 163cm x 248cm (L x W x H)

Package | Includes
SS2 Single Station STATIONSS2 | Lat Pulldown Bar, Curl Bar, Tricep Rope, Single Handle and Ankle Straps included
GS6 Pro Gym Package STATIONGS6-PRO | GS6 Multistation MF-4000 Bench
GS6 Ultimate Gym Package STATIONGS6-ULTIMATE | GS6 Multistation MF-4000 Bench 103kg Upgraded Weight Stack

*Weight Stack can be purchased additionally

Attachments

Close Grip V Handle ATTACHVTRIANGLE
D Bar ATTACHDBAR
Lat Pulldown Bar ATTACHLATPULLDOWNBAR

D Stirrup Handle ATTACHDSTIRRUPHANDLE
Revolving Straight Bar ATTACHREVOLVESTRAIGHTBAR
Cable Curl Bar ATTACHCABLECURLBAR

Tricep Rope ATTACHTRICEPROPE
Tri Pushdown Bar ATTACHTRIPRESSBAR
25kg Weight Stack Addon for GS6/SS2 WPSCONC25

FT10 Cable Crossover Station

STATIONFT10 • Weight holder compatible with 25/50mm weights.
• Solid construction made of steel square tube
• All parts powder-coated or chromed as protection
against corrosion and scratching.
• Lower lat pulldown with stable footrest
• Rubberised handles for good grip
• Includes 1 x Cable Pulley Station (Assembly Set),
2 x Weight Bracket 25mm, 2 x Weight Bracket 50mm,
1 x Longitudinal Tension Rod
Assembled Size:
160cm x 180cm x 210cm (L x W x H)

FT40 Pin Loaded Cable Crossover Station

STATIONFT40
• Plug pin coupling for quick selection of the weight
load in steps of 5kg.
• 17 hole notches each with 10cm distance from the
positioning of the pull handles.
• Weights with aperture as injury protection
• Solid construction made of steel square tube
• All parts powder-coated or chromed as protection
against corrosion and scratching.
• 2.1m high pull-up bar with varied grip lengths
and angles.
Includes:
• 1 x Cable Pull Station (Assembly Kit)
• 36 x 5kg Weight Plate
• 2 x Nylon Single Handles
Assembled Size:
112cm x 201cm x 213cm (L x W x H)
Special Order Only.
Call 1300 169 600 for more information.

Standard 25mm Weight Plates

25mm Cast Iron Weights

*Please refer to the website to see weight sets.

Standard EZ Curl Bar

CURLBARSTD47

Standard Dumbbell Handles

DBSTANDARD14

Standard Tri Bar

TRIBARSTD

Standard Barbell

BARBELLSTD72A

20kg Standard Dumbbell Set with Case

DBSET20CASE
• Dumbbell Handles with Rubber   	  Grips & Spiral Lock Collars
• Set comes with 4 x 1.25kg,
4 x 2.5kg Cast Iron Plates
• Carry Case included

Standard Weight Tree

WTSTANDARD
• 3-Tier Weight Tree
• For Standard Weight Plates (25mm)
• 2 Standard Bar/Barbell Holders

studio 30mm Weight Plates

Standard 30mm Barbell

BARBELLSTD72A-30MM

30mm EnduraShell Weight Plates

• 1.25kg  WPCEMENT1.25
• 2.5kg   WPCEMENT2.5

• 5kg   WPCEMENT5
• 10kg  WPCEMENT10

Pump Studio Barbell

STUDIO-WEIGHTSET
• 140cm x 30mm dia. Studio Barbell with rubber grip (35mm grip)
• 30mm hole diameter to suit Pump/Studio Barbells
• 8 sided anti-roll design
• Rubber Constructed
• Colour coded for different weights
• Spring Collar Clamps included

Olympic 50mm Weight Plates

Olympic Bars & Accessories

Olympic Tri Bar

OLYTRIBAR

Olympic Lock Jaw Collars (Pairs)

OLYCOLLARS-LOCKJAW

Olympic Curl Bar

OLYCURLBAR

7ft 15kg Olympic Barbell (4 Bearings / 317kg Max)

OLYBARBELL15L

7ft Olympic Barbell (4 Bearings / 317kg Max)

OLYBARBELL20L

Olympic Dumbbell Handles

OLYDUMBBELLPAIR

7ft Olympic Barbell (8 Bearings / 317kg Max)

OLYBARBELL20LB

7ft Olympic Competition Barbell (8 Bearings / 900kg Max)

OLYBARBELL20COMP

Black Bumper Plates

Competition Bumper Plates

• Built to IWF Specifications of 450mm in diameter
• Designed for Olympic Lifting, Cross fit, and general gym use

Available Sizes:
• 5kg   BUMPPLATEBK-05KG
• 10kg  BUMPPLATEBK-10KG
• 15kg  BUMPPLATEBK-15KG
• 20kg BUMPPLATEBK-20KG
• 25kg BUMPPLATEBK-25KG

• Constructed using super tough PolyUrethane
• Built to IWF Specifications of 450mm in diameter
• Dead Bounce Design

Available Sizes:
• 5kg   BUMPPLATECOMP-05KG
• 10kg  BUMPPLATECOMP-10KG
• 15kg  BUMPPLATECOMP-15KG
• 20kg  BUMPPLATECOMP-20KG
• 25kg  BUMPPLATECOMP-25KG

Olympic Tri-Grip

Built to commercial standards with heavy duty rubber to ensure maximum durability and protection for your
equipment, walls or floors.

• 2.5kg  OLYPLATE-2.5KG
• 5kg     OLYPLATE-5KG

Barbell Squat Pad

BARBELLSQUATPAD
• 10cm Diameter
• 43cm Total Length

Barbell Lifter

BARBELLLIFTER
• Allows for easy weight racking & un-racking
• Raises Barbell to 310mm
• 200kg Max Weight
• Nylon Wear Pads protect Barbell
• Durable Steel Construction

Dumbbells

Adjustable Dumbbell Pair

DBADJUST52.5PAIR
DBADJUST52.5PAIR-STAND
DBADJUSTSTAND
• Smart locking system
• Contoured handle for easy
gripping Weight System
• Adjustable from 5lb to 52.5lb
(2.3kg to 24kg)
• Stand is an optional extra
• Change weight in seconds

Hex Dumbbell Set 1-10kg

DBHEXSET
• 10 pairs of Hex Dumbbells (1 - 10kg)
• 10-Tier Dumbbell Stand
• Rubber coated for handling and safety
• Embossed Weight (kg)

Olympic Weight Tree

WTOLYMPIC
• 3-Tier Weight Tree
• For Olympic Weight Plates (50mm)
• Evenly spaced to fit 450mm Dia. Plates
• 2 Olympic Bar/Barbell Holders

Vinyl Dumbbell Pair 4lb

DBHAND4LBSPAIR
• Build Strength & Tone muscles
•  Vinyl PVC Construction
•  Easy to hold & grip
•  Hexagonal Heads (Anti-Roll)

Pro-Fixed Dumbbells 5kg-30kg

DBPRO2SET5-30KG
• Heavy Duty Gym Quality Dumbbells
• Rubber Pro-Style with Weight (kg) Embossed
• 385kg of Dumbbells from 5kg -30kg (11 Pairs)
• Knurl Grip Handles
• 2-Tier Dumbbell Rack

Kettlebells

Cast Iron Kettlebells

Available Sizes:
• 4kg KBVINYL4  		• 12kg KBVINYL12
• 6kg KBVINYL6  		• 16kg KBVINYL16
• 8kg KBVINYL8		• 20kg KBVINYL20
• 10kg KBVINYL10
• Kettlebell Set 4kg to 20kg  KBVINYLSET4-20KG
• Kettlebell Set 4kg to 12kg   KBVINYLSET4-12KG
• 2-Tier Kettlebell Rack           KETTLEBELLRACK2T

Adjustable Kettlebell 10kg

Standard Kettlebells

KBADJUST10KG
• Up to a maximum of 10kg weights are included
• Thick Rope with Padded Handles
• Ergonomically designed to feel like a normal kettlebell

Available Sets:
• Kettlebell Set 6kg to 16kg KBSTANDARDSET6-16KG
• 6kg KBSTANDARD6  	 • 8kg KBSTANDARD8
• 10kg KBSTANDARD10 	 • 12kg KBSTANDARD12
• 16kg KBSTANDARD16

Weight Balls & Bags

Slam Balls

Slam Balls X

• Hard, Durable Shell
• Textured Pattern
Available Sizes:
• 6kg SLAMBALL6KG  	• 12kg SLAMBALL12KG
• 8kg  SLAMBALL8KG	• 15kg SLAMBALL15KG
• 10kg SLAMBALL10KG  	• 20kg SLAMBALL20KG
• Medicine Ball Rack MEDBALLRACK10
• Slam Ball Complete 71kg Set SLAMBALLSET71

• Extra Durable Shell
• Strong Tyre Tread Grip
Available Sizes
• 6kg SLAMBALLX6KG
• 8kg  SLAMBALLX8KG
• 10kg SLAMBALLX10KG
• 12kg SLAMBALLX12KG

Medicine Balls

Wall Balls

Our Rubber Medicine balls are great for developing strength, power, endurance, and are suitable for all levels of abilities and ages.
Available Sizes:
• 2kg MEDBALL2 		• 8kg MEDBALL8
• 4kg MEDBALL4 		• 10kg MEDBALL10
• 6kg MEDBALL6
• Medicine Ball Rack MEDBALLRACK10
• Medicine Ball 30kg Set MEDBALLSET30

Great for drills to improve weightlifting movements, train strength
and target multiple muscle areas.
Available Sizes:
• 4kg WALLBALL-4KG	• 6kg WALLBALL-6KG
• 8kg WALLBALL-8KG 	• 10kg WALLBALL-10KG
• Wall Ball Complete 28kg Set WALLBALLSET28

Power Bags X

Power Bags are an excellent conditioning tool and the soft
construction of the bag allows for a safe, effective functional way
to train.
Available Sizes:
• 5kg   POWERBAG-5KG 	• 20kg POWERBAG-20KG
• 10kg POWERBAG-10KG 	• 25kg POWERBAG-25KG  • 15kg POWERBAG-15KG
• Power Bag Complete 75kg Set POWERBAGSET75

PLYOMETRIC BOXES

Plyo Box Set 30cm / 45cm / 60cm

Wooden 3-in-1 Multi Plyo Box

The Original Plyometric Box. Steel Frame for exceptional durability & strength. Rubber Slip Resistant platform & rubber feet for safety
& stability.
Available Sizes:
• 12” (30cm)  PLYOBOX30-BK
• 18” (45cm)  PLYOBOX45-BK
• 24” (60cm) PLYOBOX60-BK

PLYOBOXWOOD3IN1
• Roll over to adjust 3 different heights (51cm, 61cm, 76cm)
•  Side handles for easy mobility
• Flat packed & easy assembly

Soft 3-in-1 Multi Plyo Box

PLYOBOX-3IN1
• Capable of adjustment to 3 different heights (51cm, 61cm, 76cm),
to allow for progressive exercises.
• Heavy 30kg structure to keep it sturdy
• Soft Structure to cushion accidental falls
• Heavy Duty PVC Layer
• Ultra-High Density Foam

Soft Plyo Box Set of 4

PLYOBOXSOFT-SET
• Set comes with 15cm, 30cm, 45cm,
60cm tall Plyometric Foam Boxes
• Base size: 90cm x 75cm (L x W)
• Soft structure to cushion
accidental falls
• Heavy Duty PVC Layer
• Ultra-High Density Foam
Available SIzes:
• 15cm   PLYOBOXSOFT15
• 30cm  PLYOBOXSOFT30
• 45cm  PLYOBOXSOFT45
• 60cm PLYOBOXSOFT60

Exercise & Cross Training Gear

Adjustable Weight Vest

• Easily Add/Remove weight bags to adjust weight for 20kg/30kg
• Triple Velcro Strap for a perfect fit
• Shoulder Strap Buckle for easy removal
Available Sizes:
• Up to 10kg  WEIGHTVEST-10kg
• Up to 20kg  WEIGHTVEST-20kg
• Up to 30kg  WEIGHTVEST-30kg

10kg
Weight Vest

20kg / 30kg Weight Vest

Battle Ropes

• Excellent cardio workout tool
• Maximise fat burn & tone muscles
Available Sizes:
• 15m x 38mm Dia., 13kg ROPEBATTLE3815

Speed Skipping Ropes

• Precision Ball Bearings & Steel Head
• 3m coated and adjustable cable
• Machined aluminium handles
Available Colours:
• Black SKIPROPE-BK
• Silver SKIPROPE-SIL2

RevoBounce 40” Fitness Trampoline

TRMINI40-2
Our Revo Bounce Trampoline will burn
heaps of calories while toning quads,
glutes and calves for fun-packed aerobic
workout.
• Comes with resistance bands to
intensify and add variation to
your workout.

Quantum 2 Inversion Table

INVERSIONTABLEQUANTUM2
Take advantage of inversion therapy. De-compress spinal area to relieve back pain or prolonged back stress.
Assembled Size: 108cm x 69cm x 148cm
(L x W x H)

Resistance Bands Handle

Resistance Bands

BANDRESISTHANDLE
• Handles provide extra grip on pulling exercises
• Steel construction for strength & durability
• More natural grip for most movements

Purchase separately or in sets:
• Set of 5 BANDRESIST-SET5		• Set of 10 BANDRESIST-SET10
• 5mm (Red) - Up to 10kg Resistance
• 13mm (Blue) - Up to 15kg Resistance
• 21mm (Purple) - Up to 30kg Resistance
• 32mm (Orange) - Up to 45kg Resistance
• 45mm (Green) - Up to 60kg Resistance

Parallel Bars (Pairs)

Wooden Gym Ring (Pairs)

BARSPARALLEL
Simple, portable, extremely versatile and highly multi-purpose to
work arms, chest, back and core muscles.
• Thick Wall Steel Design
• Soft Foam Grips

GYMRING
• Crafted Wooden Ring and built to FIG Specifications
• 4.0m long, 2.5cm wide adjustable nylon straps

Folding Exercise Mat 1.8m

Fitness Ball

MATEXERFOLDING
Folding Exercise Mat is a great accessory, perfect for any type of
work or stretching routine, pilates, gymnastics and any sort of
general fitness.
• Folds into 3 parts
• Convenient Carry Handle
Assembled Size: 180cm x 60cm x 5cm (L x W x H)
Folded Size: 60cm x 60cm x 15cm (L x W x H)

•  Anti-burst material
•  Air pump included
Available Sizes
• 65cm FITNESSBALL65-GY
• 85cm FITNESSBALL85-GY

YOGA & THERAPY

01  Yoga Wheel

YOGAWHEEL-BLU
Excellent tool for stretching, great for Back / Shoulder / Chest opening and quad / hip flex or stretching.
• 15cm Wide
• 32cm Diameter
• ABS Plastic

02  Yoga Mat

Available in 2 colours:
• Pink MATYOGA14PK
• Blue MATYOGA14BLU
Our Dual-Layer Mats are made
with eco-friendly TPE, and come with a soft, comfortable surface while having a grippy, durable underside layer.
Assembled Size:
183cm x 61cm x 0.5cm (L x W x H)

Foam Roller

• Made from High Quality Density EVA Foam
• Strong core to retain shape
Available Sizes:
• 90cm ROLLERFOAM90

02  Yoga Mat
(Pink)

Grid Foam Roller

Grid Sections with different groove patterns to allow you to vary the intensity of the pressure points.
Available Sizes:
• 33cm ROLLEREVAFOAM33
• 60cm ROLLEREVAFOAM60

Lifespan Fitness makes every effort to maintain the accuracy and quality of the information provided on this catalogue.
However, Lifespan Fitness cannot guarantee, and assumes no legal liability or responsibility, for the accuracy or
completeness of the information provided. The information contained on this catalogue is for general guidance only.
The copyright of all content on this catalogue is owned by Global Fitness and Leisure and/or the various manufacturers of our equipment. No part of the Lifespan Fitness catalogue may be changed, reproduced, stored in or transmitted on any website or medium without
the prior written permission of Lifespan Fitness. Requests to republish any material must be sent to info@lifespanfitness.com.au.